<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.3.0">
<drawing>
<board>
<plain>
<wire x1="44.45" y1="19.05" x2="82.22" y2="19.05" width="0.4064" layer="20"/>
<wire x1="82.22" y1="19.05" x2="82.22" y2="54.6" width="0.4064" layer="20"/>
<wire x1="82.22" y1="54.6" x2="44.45" y2="54.6" width="0.4064" layer="20"/>
<wire x1="44.45" y1="54.6" x2="44.45" y2="19.05" width="0.4064" layer="20"/>
</plain>
<libraries>
<library name="fab">
<packages>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="SOIC14">
<description>&lt;b&gt;Small Outline Package&lt;/b&gt;</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="EFOBM">
</package>
<package name="2X03SMD">
</package>
<package name="1X06SMD">
</package>
<package name="LED1206">
<description>LED 1206 pads (standard pattern)</description>
</package>
</packages>
</library>
<library name="Hall Effect">
<description>&lt;h3&gt;SparkFun Sensors&lt;/h3&gt;
This library contains sensors- accelerometers, gyros, compasses, magnetometers, light sensors, imagers, temp sensors, etc.
&lt;br&gt;
&lt;br&gt;
We've spent an enormous amount of time creating and checking these footprints and parts, but it is &lt;b&gt; the end user's responsibility&lt;/b&gt; to ensure correctness and suitablity for a given componet or application.
&lt;br&gt;
&lt;br&gt;If you enjoy using this library, please buy one of our products at &lt;a href=" www.sparkfun.com"&gt;SparkFun.com&lt;/a&gt;.
&lt;br&gt;
&lt;br&gt;
&lt;b&gt;Licensing:&lt;/b&gt; Creative Commons ShareAlike 4.0 International - https://creativecommons.org/licenses/by-sa/4.0/
&lt;br&gt;
&lt;br&gt;
You are welcome to use this library for commercial purposes. For attribution, we ask that when you begin to sell your device using our footprint, you email us with a link to the product being sold. We want bragging rights that we helped (in a very small part) to create your 8th world wonder. We would like the opportunity to feature your device on our homepage.</description>
<packages>
<package name="SOT23-3">
<description>&lt;h3&gt;3-Pin Small-Outline Transistor (SOT-23)&lt;/h3&gt;
&lt;p&gt;&lt;a href="http://ww1.microchip.com/downloads/en/DeviceDoc/20001942F.pdf"&gt;Datasheet&lt;/a&gt;&lt;/p&gt;
&lt;p&gt;Specifications:
&lt;ul&gt;
&lt;li&gt;Pin Count: 3&lt;/li&gt;
&lt;li&gt;Area: 2.9 x 2.3 x 1.0 mm&lt;/li&gt;
&lt;li&gt;Pitch: 0.95 mm&lt;/li&gt;
&lt;/ul&gt;
&lt;p&gt;Devices Using:&lt;/p&gt;
&lt;ul&gt;
&lt;li&gt;MCP9700&lt;/li&gt;
&lt;/ul&gt;</description>
</package>
</packages>
</library>
<library name="thermistor">
<packages>
<package name="THERMAL1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
</packages>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<elements>
<element name="C1" library="fab" package="C1206" value="1uF">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="HALLEFFECT" library="Hall Effect" package="SOT23-3" value="MCP9700TT">
<attribute name="NAME"/>
<attribute name="PROD_ID" value="IC-08917"/>
<attribute name="VALUE"/>
</element>
<element name="IC1" library="fab" package="SOIC14" value="ATTINY44-SSU">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R1" library="thermistor" package="THERMAL1206" value="">
<attribute name="NAME"/>
</element>
<element name="R2" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R3" library="fab" package="R1206" value="200">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R5" library="fab" package="R1206" value="0">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R6" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R7" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="R8" library="fab" package="R1206" value="10k">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$1" library="fab" package="EFOBM" value="RESONATOR 20MHz"/>
<element name="U$2" library="fab" package="2X03SMD" value="AVRISPSMD">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
<element name="U$3" library="fab" package="1X06SMD" value="FTDI-SMD-HEADER">
<attribute name="NAME"/>
</element>
<element name="U$4" library="fab" package="LED1206" value="LED">
<attribute name="NAME"/>
<attribute name="VALUE"/>
</element>
</elements>
<signals>
<signal name="VCC">
<contactref element="HALLEFFECT" pad="1"/>
<contactref element="IC1" pad="1"/>
<contactref element="R2" pad="1"/>
<contactref element="C1" pad="1"/>
<contactref element="R5" pad="1"/>
<contactref element="U$2" pad="2"/>
<contactref element="R5" pad="2"/>
<contactref element="U$3" pad="3"/>
<contactref element="R8" pad="2"/>
<contactref element="R6" pad="2"/>
</signal>
<signal name="GND">
<contactref element="HALLEFFECT" pad="3"/>
<contactref element="IC1" pad="14"/>
<contactref element="U$1" pad="2"/>
<contactref element="U$3" pad="1"/>
<contactref element="C1" pad="2"/>
<contactref element="U$2" pad="6"/>
<contactref element="U$4" pad="2"/>
<contactref element="R1" pad="2"/>
<contactref element="R7" pad="2"/>
</signal>
<signal name="N$1">
<contactref element="U$1" pad="3"/>
<contactref element="IC1" pad="3"/>
</signal>
<signal name="N$2">
<contactref element="U$1" pad="1"/>
<contactref element="IC1" pad="2"/>
</signal>
<signal name="RX">
<contactref element="IC1" pad="12"/>
<contactref element="U$3" pad="5"/>
</signal>
<signal name="TX">
<contactref element="IC1" pad="13"/>
<contactref element="U$3" pad="4"/>
</signal>
<signal name="MISO">
<contactref element="IC1" pad="8"/>
<contactref element="U$2" pad="1"/>
</signal>
<signal name="SCK">
<contactref element="IC1" pad="9"/>
<contactref element="U$2" pad="3"/>
</signal>
<signal name="MOSI">
<contactref element="IC1" pad="7"/>
<contactref element="U$2" pad="4"/>
</signal>
<signal name="RST">
<contactref element="IC1" pad="4"/>
<contactref element="U$2" pad="5"/>
<contactref element="R2" pad="2"/>
</signal>
<signal name="N$4">
<contactref element="U$4" pad="1"/>
<contactref element="R3" pad="2"/>
</signal>
<signal name="LED">
<contactref element="R3" pad="1"/>
<contactref element="IC1" pad="5"/>
</signal>
<signal name="R8">
<contactref element="R1" pad="1"/>
<contactref element="R8" pad="1"/>
<contactref element="IC1" pad="11"/>
</signal>
<signal name="R7">
<contactref element="IC1" pad="6"/>
<contactref element="R7" pad="1"/>
<contactref element="R6" pad="1"/>
</signal>
<signal name="VO">
<contactref element="HALLEFFECT" pad="2"/>
<contactref element="IC1" pad="10"/>
</signal>
</signals>
</board>
</drawing>
</eagle>
